array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'uk', ), 'this' => array ( 0 => 'parle-rlexer.gettoken.php', 1 => 'Parle\\RLexer::getToken', 2 => 'Retrieve the current token', ), 'up' => array ( 0 => 'class.parle-rlexer.php', 1 => 'Parle\\RLexer', ), 'prev' => array ( 0 => 'parle-rlexer.dump.php', 1 => 'Parle\\RLexer::dump', ), 'next' => array ( 0 => 'parle-rlexer.insertmacro.php', 1 => 'Parle\\RLexer::insertMacro', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'en', 'path' => 'reference/parle/parle/rlexer/gettoken.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

Parle\RLexer::getToken

(PECL parle >= 0.5.1)

Parle\RLexer::getTokenRetrieve the current token

Опис

public Parle\RLexer::getToken(): Parle\Token

Retrive the current token.

Параметри

У цієї функції немає параметрів.

Значення, що повертаються

Returns an instance of Parle\Token.