array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'uk', ), 'this' => array ( 0 => 'gmagickdraw.setfont.php', 1 => 'GmagickDraw::setfont', 2 => 'Sets the fully-specified font to use when annotating with text', ), 'up' => array ( 0 => 'class.gmagickdraw.php', 1 => 'GmagickDraw', ), 'prev' => array ( 0 => 'gmagickdraw.setfillopacity.php', 1 => 'GmagickDraw::setfillopacity', ), 'next' => array ( 0 => 'gmagickdraw.setfontsize.php', 1 => 'GmagickDraw::setfontsize', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'en', 'path' => 'reference/gmagick/gmagickdraw/setfont.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

GmagickDraw::setfont

(PECL gmagick >= Unknown)

GmagickDraw::setfontSets the fully-specified font to use when annotating with text

Опис

public GmagickDraw::setfont(string $font): GmagickDraw

Sets the fully-specified font to use when annotating with text

Параметри

font

font name

Значення, що повертаються

The GmagickDraw object.