array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'uk', ), 'this' => array ( 0 => 'function.random-int.php', 1 => 'random_int', 2 => 'Get a cryptographically secure, uniformly selected integer', ), 'up' => array ( 0 => 'ref.random.php', 1 => 'Random Функції', ), 'prev' => array ( 0 => 'function.random-bytes.php', 1 => 'random_bytes', ), 'next' => array ( 0 => 'function.srand.php', 1 => 'srand', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'en', 'path' => 'reference/random/functions/random-int.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

random_int

(PHP 7, PHP 8)

random_intGet a cryptographically secure, uniformly selected integer

Опис

random_int(int $min, int $max): int

Generates a uniformly selected integer between the given minimum and maximum.

The randomness generated by this function is suitable for all applications, including the generation of long-term secrets, such as encryption keys.

Генератори випадковостей, впорядковані за пріоритетом:

Зауваження: Хоча цю функцію додано в PHP 7.0, для версій від 5.2 до 5.6 включно доступна » користувацька реалізація.

Параметри

min

The lowest value to be returned.

max

The highest value to be returned.

Значення, що повертаються

A cryptographically secure, uniformly selected integer from the closed interval [min, max]. Both min and max are possible return values.

Помилки/виключення

Журнал змін

Версія Опис
8.2.0 In case of a CSPRNG failure, this function will now throw a Random\RandomException. Previously a plain Exception was thrown.

Приклади

Приклад #1 random_int() example

<?php
var_dump(random_int(100, 999));
var_dump(random_int(-1000, 0));
?>

Поданий вище приклад виведе щось схоже на:

int(248)
int(-898)

Прогляньте також