array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'pt_BR', ), 'this' => array ( 0 => 'function.libxml-clear-errors.php', 1 => 'libxml_clear_errors', 2 => 'Limpa o buffer de erro da libxml', ), 'up' => array ( 0 => 'ref.libxml.php', 1 => 'Funções da libxml', ), 'prev' => array ( 0 => 'ref.libxml.php', 1 => 'Funções da libxml', ), 'next' => array ( 0 => 'function.libxml-disable-entity-loader.php', 1 => 'libxml_disable_entity_loader', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'pt_BR', 'path' => 'reference/libxml/functions/libxml-clear-errors.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

libxml_clear_errors

(PHP 5 >= 5.1.0, PHP 7, PHP 8)

libxml_clear_errors Limpa o buffer de erro da libxml

Descrição

libxml_clear_errors(): void

libxml_clear_errors() limpa o buffer de erro da libxml.

Parâmetros

Esta função não possui parâmetros.

Valor Retornado

Nenhum valor é retornado.

Veja Também