array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'yaf-request-abstract.setdispatched.php', 1 => 'Yaf_Request_Abstract::setDispatched', 2 => 'The setDispatched purpose', ), 'up' => array ( 0 => 'class.yaf-request-abstract.php', 1 => 'Yaf_Request_Abstract', ), 'prev' => array ( 0 => 'yaf-request-abstract.setcontrollername.php', 1 => 'Yaf_Request_Abstract::setControllerName', ), 'next' => array ( 0 => 'yaf-request-abstract.setmodulename.php', 1 => 'Yaf_Request_Abstract::setModuleName', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'ja', 'path' => 'reference/yaf/yaf_request_abstract/setdispatched.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

Yaf_Request_Abstract::setDispatched

(Yaf >=1.0.0)

Yaf_Request_Abstract::setDispatchedThe setDispatched purpose

説明

public Yaf_Request_Abstract::setDispatched(): void

警告

この関数は、 現在のところ詳細な情報はありません。引数のリストのみが 記述されています。

パラメータ

この関数にはパラメータはありません。

戻り値