array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'swoole-http-server.start.php', 1 => 'Swoole\\Http\\Server::start', 2 => 'Start the swoole http server.', ), 'up' => array ( 0 => 'class.swoole-http-server.php', 1 => 'Swoole\\Http\\Server', ), 'prev' => array ( 0 => 'swoole-http-server.on.php', 1 => 'Swoole\\Http\\Server::on', ), 'next' => array ( 0 => 'class.swoole-lock.php', 1 => 'Swoole\\Lock', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'en', 'path' => 'reference/swoole/swoole/http/server/start.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

Swoole\Http\Server::start

(PECL swoole >= 1.9.0)

Swoole\Http\Server::startStart the swoole http server.

説明

public Swoole\Http\Server::start(): void

Start the swoole http server.

パラメータ

この関数にはパラメータはありません。

戻り値