array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'gearmanworker.returncode.php', 1 => 'GearmanWorker::returnCode', 2 => 'Get last Gearman return code', ), 'up' => array ( 0 => 'class.gearmanworker.php', 1 => 'GearmanWorker', ), 'prev' => array ( 0 => 'gearmanworker.removeoptions.php', 1 => 'GearmanWorker::removeOptions', ), 'next' => array ( 0 => 'gearmanworker.setid.php', 1 => 'GearmanWorker::setId', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'en', 'path' => 'reference/gearman/gearmanworker/returncode.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

GearmanWorker::returnCode

(PECL gearman >= 0.5.0)

GearmanWorker::returnCodeGet last Gearman return code

説明

public GearmanWorker::returnCode(): int

Returns the last Gearman return code.

パラメータ

この関数にはパラメータはありません。

戻り値

A valid Gearman return code.

参考