array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'function.socket-set-blocking.php', 1 => 'socket_set_blocking', 2 => 'stream_set_blocking のエイリアス', ), 'up' => array ( 0 => 'ref.network.php', 1 => 'ネットワーク 関数', ), 'prev' => array ( 0 => 'function.socket-get-status.php', 1 => 'socket_get_status', ), 'next' => array ( 0 => 'function.socket-set-timeout.php', 1 => 'socket_set_timeout', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'ja', 'path' => 'reference/network/functions/socket-set-blocking.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

socket_set_blocking

(PHP 4, PHP 5, PHP 7, PHP 8)

socket_set_blockingstream_set_blocking() のエイリアス

説明

この関数は次の関数のエイリアスです。 stream_set_blocking().