array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'function.recode.php', 1 => 'recode', 2 => 'recode_string のエイリアス', ), 'up' => array ( 0 => 'ref.recode.php', 1 => 'Recode 関数', ), 'prev' => array ( 0 => 'ref.recode.php', 1 => 'Recode 関数', ), 'next' => array ( 0 => 'function.recode-file.php', 1 => 'recode_file', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'ja', 'path' => 'reference/recode/functions/recode.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

recode

(PHP 4, PHP 5, PHP 7 < 7.4.0)

recoderecode_string() のエイリアス

説明

この関数は次の関数のエイリアスです。 recode_string().