array ( 0 => 'index.php', 1 => 'PHP Manual', ), 'head' => array ( 0 => 'UTF-8', 1 => 'ja', ), 'this' => array ( 0 => 'ffi-ctype.getkind.php', 1 => 'FFI\\CType::getKind', 2 => '説明', ), 'up' => array ( 0 => 'class.ffi-ctype.php', 1 => 'FFI\\CType', ), 'prev' => array ( 0 => 'ffi-ctype.getfuncreturntype.php', 1 => 'FFI\\CType::getFuncReturnType', ), 'next' => array ( 0 => 'ffi-ctype.getname.php', 1 => 'FFI\\CType::getName', ), 'alternatives' => array ( ), 'source' => array ( 'lang' => 'ja', 'path' => 'reference/ffi/ctype/getkind.xml', ), 'history' => array ( ), ); $setup["toc"] = $TOC; $setup["toc_deprecated"] = $TOC_DEPRECATED; $setup["parents"] = $PARENTS; manual_setup($setup); contributors($setup); ?>

FFI\CType::getKind

(PHP 8 >= 8.1.0)

FFI\CType::getKind説明

説明

public FFI\CType::getKind(): int

警告

この関数は、 現在のところ詳細な情報はありません。引数のリストのみが 記述されています。

パラメータ

この関数にはパラメータはありません。

戻り値